η 4- 3- 2- 1- 0 1 2 3 4 5

ratios {2} nv

0.2 0.3 0.4 0.5 0.6 0.7 0.8 = 2.76 TeV NNs ALICE 30-40% Pb-Pb

2/v_3v_3/v_4v 0.1× ^2/v_4v

η 4- 3- 2- 1- 0 1 2 3 4 5

Rescaled

0.6 0.8 1 1.2 1.4